\begingroup
\message{UTF-8 hyphenation patterns for Modern Greek and English}%
\expandafter\ifx\csname XeTeXrevision\endcsname\relax
  \input hyphen
\else
  \input hyphen
  \input utf8-grmhyph4.tex
\fi
\endgroup
\endinput

